
diff -r 1fbce408813c -r f70d764aab33 install/schemas/mysql_stage2.sql
--- a/install/schemas/mysql_stage2.sql	Tue Sep 16 08:22:47 2008 -0400
+++ b/install/schemas/mysql_stage2.sql	Sun Sep 21 09:01:27 2008 -0400
@@ -115,6 +115,7 @@
   user_timezone int(12) UNSIGNED NOT NULL DEFAULT 0,
   user_title varchar(64) DEFAULT NULL,
   user_group mediumint(5) NOT NULL DEFAULT 1,
+  user_dst varchar(11) NOT NULL DEFAULT '0;0;0;0;60',
   PRIMARY KEY  (user_id)
 ) CHARACTER SET `utf8` COLLATE `utf8_bin`;
 




