
diff -r 380e55865f86 -r 6f0bbf88c325 upgrade.sql
--- a/upgrade.sql	Mon Sep 24 21:29:19 2007 -0400
+++ b/upgrade.sql	Mon Sep 24 23:59:31 2007 -0400
@@ -3,7 +3,7 @@
 -- ALL NON-SQL LINES, even otherwise blank lines, must start with "--" or they will get sent to MySQL!
 -- Common tasks (version numbers)
 DELETE FROM {{TABLE_PREFIX}}config WHERE config_name='enano_version' OR config_name='enano_beta_version' OR config_name='enano_alpha_version' OR config_name='enano_rc_version';
-INSERT INTO {{TABLE_PREFIX}}config (config_name, config_value) VALUES( 'enano_version', '1.0.2' );
+INSERT INTO {{TABLE_PREFIX}}config (config_name, config_value) VALUES( 'enano_version', '1.0.2' ),( 'enano_beta_version', '1' );
 ---BEGIN 1.0.1.1---
 -- No changes in this release
 ---END 1.0.1.1---




